1.2 1.3 1.4 1.5 1.6 1.7 1.8 1.9 2.0 2.1 2.2 )^2c

(GeV/ m 0 20 40 60 80 100 120 140 160 180 200 220

2c Counts per 40 GeV/ c < 0.2 GeV/ Tp | < 0.8 y|

ALICE data Signal Background σ Significance: 5.8

= 5.02 TeV NNs ALICE Pb-Pb UPC